% run this through LaTeX with the appropriate wrapper
%	RoSAP Failure Codes (continued)

\normalsize
\[\begin{tabular}{rp{3.0in}}
    \multicolumn{2}{c}{\bf User-Initiated Rejects (non-fatal)}\\
\tt ROS\_IP\_DUP&	Duplicate invocation\\
\tt ROS\_IP\_UNRECOG&	Unrecognized operation\\
\tt ROS\_IP\_MISTYPED&	Mistyped argument\\
\tt ROS\_IP\_LIMIT&	Resource limitation\\
\tt ROS\_IP\_RELEASE&	Initiator releasing\\
\tt ROS\_IP\_UNLINKED&	Unrecognized linked ID\\
\tt ROS\_IP\_LINKED&	Linked response unexpected\\
\tt ROS\_IP\_CHILD&	Unexpected child operation\\
\tt ROS\_RRP\_UNRECOG&	Unrecognized invocation\\
\tt ROS\_RRP\_UNEXP&	Result response unexpected\\
\tt ROS\_RRP\_MISTYPED&	Mistyped result\\
\tt ROS\_REP\_UNRECOG&	Unrecognized invocation\\
\tt ROS\_REP\_UNEXP&	Error response unexpected\\
\tt ROS\_REP\_RECERR&	Unrecognized error\\
\tt ROS\_REP\_UNEXPERR&	Unexpected error\\
\tt ROS\_REP\_MISTYPED&	Mistyped parameter\\[0.1in]
    \multicolumn{2}{c}{\bf Interface Errors (non-fatal)}\\
\tt ROS\_PARAMETER&	Invalid parameter\\
\tt ROS\_OPERATION&	Invalid operation\\
\tt ROS\_TIMER&		Timer expired\\
\tt ROS\_WAITING&	Indications waiting\\
\tt ROS\_APDU&		APDU not transferred\\
\tt ROS\_INTERRUPTED&	Stub interrupted
\end{tabular}\]
